From cd7c92321f3714821c604e259376c729df461020 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 9 Mar 2018 18:55:40 -0800
Subject: Reference leanpub, and relax some of our language about prod use.

---
 README.adoc | 7 ++++++-
 1 file changed, 6 insertions(+), 1 deletion(-)

(limited to 'README.adoc')

diff --git a/README.adoc b/README.adoc
index 844b1de1..7e6f6e69 100644
--- a/README.adoc
+++ b/README.adoc
@@ -15,7 +15,7 @@ seeing additional testing and review.
 
 While we have made every reasonable effort to ensure that this library
 is robust and safe, it is still a *pre-release*, and details are subject
-to change.  Therefore, we do not recommend it for production use, yet.
+to change.  Caution is advised before depending upon it.
 
 NOTE: We're getting pretty close to removing this caveat though,
 and we'd like help from others in testing to further improve our confidence
@@ -56,6 +56,11 @@ either Apache or GPL licenses.
 Much of the library, but not all, is documented in the docs/ folder,
 and also https://nanomsg.github.io/nng[online].
 
+You can also buy a copy of the 
+https://leanpub.com/nngmanual/[NNG Reference Manual at Leanpub].
+(Purchases from Leanpub help fund our work, and get get a nicer
+formatted single PDF or ebook edition.)
+
 You can also explore the `nng.h` header file, which provides the public
 API. A legacy compatible `nng_compat.h` header is available and
 offers API compatibility with legacy _nanomsg_.
-- 
cgit v1.2.3-70-g09d2

