From a7b20c3babd965b12dec8cb5ff0883a4d8d1116d Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 24 Oct 2017 11:46:24 -0700
Subject: Doc directory moved to make github pages happy.

---
 doc/README.adoc | 8 --------
 1 file changed, 8 deletions(-)
 delete mode 100644 doc/README.adoc

(limited to 'doc/README.adoc')

diff --git a/doc/README.adoc b/doc/README.adoc
deleted file mode 100644
index 5030ec42..00000000
--- a/doc/README.adoc
+++ /dev/null
@@ -1,8 +0,0 @@
-This contains the nng documentation for API users.
-
-The documentation is written in asciidoc in the form of man pages.  It is
-automatically formatted for display on the website.
-
-It is possible to emit TROFF sources for use by the UNIX man page, and HTML
-for online viewing.  asciidoctor supports PDF and EPUB formats via plugins,
-so there are still more options available.
-- 
cgit v1.2.3-70-g09d2

