From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/README.adoc | 8 --------
 1 file changed, 8 deletions(-)
 delete mode 100644 docs/README.adoc

(limited to 'docs/README.adoc')

diff --git a/docs/README.adoc b/docs/README.adoc
deleted file mode 100644
index 5030ec42..00000000
--- a/docs/README.adoc
+++ /dev/null
@@ -1,8 +0,0 @@
-This contains the nng documentation for API users.
-
-The documentation is written in asciidoc in the form of man pages.  It is
-automatically formatted for display on the website.
-
-It is possible to emit TROFF sources for use by the UNIX man page, and HTML
-for online viewing.  asciidoctor supports PDF and EPUB formats via plugins,
-so there are still more options available.
-- 
cgit v1.2.3-70-g09d2

