From 5ecea06b1f39a93735e8b2f711b125d0b1a84d16 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 15 Jun 2018 12:50:03 -0700
Subject: fixes #539 Feature request: customizable http error page

---
 docs/man/libnng.3.adoc | 3 +++
 1 file changed, 3 insertions(+)

(limited to 'docs/man/libnng.3.adoc')

diff --git a/docs/man/libnng.3.adoc b/docs/man/libnng.3.adoc
index 21a34a6a..70fd3be2 100644
--- a/docs/man/libnng.3.adoc
+++ b/docs/man/libnng.3.adoc
@@ -341,7 +341,10 @@ These functions are intended for use with HTTP server applications.
 |<<nng_http_server_get_tls.3http#,nng_http_server_get_tls()>>|get HTTP server TLS configuration
 |<<nng_http_server_hold.3http#,nng_http_server_get_tls()>>|get and hold HTTP server instance
 |<<nng_http_server_release.3http#,nng_http_server_get_tls()>>|release HTTP server instance
+|<<nng_http_server_set_error_file.3http#,nng_http_server_set_error_file()>>|set custom HTTP error file
+|<<nng_http_server_set_error_page.3http#,nng_http_server_set_error_page()>>|set custom HTTP error page
 |<<nng_http_server_set_tls.3http#,nng_http_server_set_tls()>>|set HTTP server TLS configuration
+|<<nng_http_server_res_error.3http#,nng_http_server_res_error()>>|use HTTP server error page
 |<<nng_http_server_start.3http#,nng_http_server_start()>>|start HTTP server
 |<<nng_http_server_stop.3http#,nng_http_server_stop()>>|stop HTTP server
 |===
-- 
cgit v1.2.3-70-g09d2

