From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nn_connect.3compat.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nn_connect.3compat.adoc')

diff --git a/docs/man/nn_connect.3compat.adoc b/docs/man/nn_connect.3compat.adoc
index add14060..f5002b82 100644
--- a/docs/man/nn_connect.3compat.adoc
+++ b/docs/man/nn_connect.3compat.adoc
@@ -28,7 +28,7 @@ The `nn_connect()` function arranges for the socket _sock_ to
 inititate connection to a peer at the address specified by _url_.
 An "`endpoint identifier`" for this socket's association with the _url_ is
 returned to the caller on success.
-This ID can be used with `<<nn_shutdown.3compat#,nn_shutdown()>>`` to
+This ID can be used with `<<nn_shutdown.3compat#,nn_shutdown()>>` to
 "`unbind`" the socket from the address at _url_.
 
 NOTE: This function is provided for API
-- 
cgit v1.2.3-70-g09d2

