From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nn_connect.3compat.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nn_connect.3compat.adoc')

diff --git a/docs/man/nn_connect.3compat.adoc b/docs/man/nn_connect.3compat.adoc
index a5505347..01f8195a 100644
--- a/docs/man/nn_connect.3compat.adoc
+++ b/docs/man/nn_connect.3compat.adoc
@@ -25,7 +25,7 @@ int nn_connect(int sock, const char *url)
 == DESCRIPTION
 
 The `nn_connect()` function arranges for the socket _sock_ to
-inititate connection to a peer at the address specified by _url_.
+initiate connection to a peer at the address specified by _url_.
 An "`endpoint identifier`" for this socket's association with the _url_ is
 returned to the caller on success.
 This ID can be used with `<<nn_shutdown.3compat#,nn_shutdown()>>` to
-- 
cgit v1.2.3-70-g09d2

