From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nn_device.3compat.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nn_device.3compat.adoc')

diff --git a/docs/man/nn_device.3compat.adoc b/docs/man/nn_device.3compat.adoc
index 0d123911..4ca08819 100644
--- a/docs/man/nn_device.3compat.adoc
+++ b/docs/man/nn_device.3compat.adoc
@@ -44,7 +44,7 @@ one of the sockets is closed or an error occurs.
 
 == ERRORS
 
-[horizonal]
+[horizontal]
 `EBADF`:: One of the two sockets is invalid or not open, or has
 `EINVAL`:: The sockets are not compatible with each other, or not both raw.
 `ENOMEM`:: Insufficient memory is available.
-- 
cgit v1.2.3-70-g09d2

