From 74adece2303ab7c2b05459c7ff24b362e9660068 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 7 Sep 2024 10:05:27 -0700
Subject: Remove the documentation for 3compat.

---
 docs/man/nn_device.3compat.adoc | 59 -----------------------------------------
 1 file changed, 59 deletions(-)
 delete mode 100644 docs/man/nn_device.3compat.adoc

(limited to 'docs/man/nn_device.3compat.adoc')

diff --git a/docs/man/nn_device.3compat.adoc b/docs/man/nn_device.3compat.adoc
deleted file mode 100644
index c69e1e04..00000000
--- a/docs/man/nn_device.3compat.adoc
+++ /dev/null
@@ -1,59 +0,0 @@
-= nn_device(3compat)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nn_device - create forwarding device (compatible API)
-
-== SYNOPSIS
-
-[source,c]
-----
-#include <nanomsg/nn.h>
-
-int nn_device(int sock1, int sock2);
-----
-
-== DESCRIPTION
-
-The `nn_device()` function is used to create a forwarder, where messages
-received on one of the two sockets _sock1_ and _sock2_ are forwarded to
-the other.
-
-NOTE: This function is provided for API
-xref:nng_compat.3compat.adoc[compatibility] with legacy _libnanomsg_.
-Consider using the relevant xref:libnng.3.adoc[modern API] instead.
-
-The two sockets must be compatible, and must be
-xref:nng.7.adoc#raw_mode[raw mode]
-sockets.
-More detail about devices and how they can be used is available in the
-new style xref:nng_device.3.adoc[nng_device()] documentation.
-
-== RETURN VALUES
-
-This function blocks forever, and will return -1 only when
-one of the sockets is closed or an error occurs.
-
-== ERRORS
-
-[horizontal]
-`EBADF`:: One of the two sockets is invalid or not open, or has
-`EINVAL`:: The sockets are not compatible with each other, or not both raw.
-`ENOMEM`:: Insufficient memory is available.
-
-== SEE ALSO
-
-[.text-left]
-xref:nn_errno.3compat.adoc[nn_errno(3compat)],
-xref:nn_socket.3compat.adoc[nn_socket(3compat)],
-xref:nng_compat.3compat.adoc[nng_compat(3compat)],
-xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

