From 0ddaee41ec753805fa12eeabd679870802528dac Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 29 May 2018 17:03:51 -0700
Subject: fixes #495 SEE ALSO should use [align=left] fixes #494 ERRORS section
 should use [horizontal]

These changes address some basic formatting consistency things,
and ultimately (when combined with other tooling changes that are
not part of this repo) lead to vastly improved layout in the
printed documentation.

While here we removed trailing whitespace, and did certain other
minor markup tweaks.
---
 docs/man/nn_errno.3compat.adoc | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'docs/man/nn_errno.3compat.adoc')

diff --git a/docs/man/nn_errno.3compat.adoc b/docs/man/nn_errno.3compat.adoc
index 316a419e..655906e9 100644
--- a/docs/man/nn_errno.3compat.adoc
+++ b/docs/man/nn_errno.3compat.adoc
@@ -33,7 +33,7 @@ Consider using the relevant <<libnng.3#,modern API>> instead.
 
 IMPORTANT: The error numbers returned from this function may include
 errors caused by system functions, which overlap the usual `errno` variable,
-and this function simply returns the value of `errno`. 
+and this function simply returns the value of `errno`.
 However, the values returned may include numeric values that are not
 defined by the system, but are unique to _libnanomsg_, such as `EFSM`.
 
@@ -73,6 +73,7 @@ If no operation has failed, then this will be zero.
 
 == SEE ALSO
 
+[.text-left]
 <<nn_strerror.3compat#,nn_strerror(3compat)>>,
 <<nng_compat.3compat#,nng_compat(3compat)>>,
 <<nng.7#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

