From 74adece2303ab7c2b05459c7ff24b362e9660068 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 7 Sep 2024 10:05:27 -0700
Subject: Remove the documentation for 3compat.

---
 docs/man/nn_errno.3compat.adoc | 79 ------------------------------------------
 1 file changed, 79 deletions(-)
 delete mode 100644 docs/man/nn_errno.3compat.adoc

(limited to 'docs/man/nn_errno.3compat.adoc')

diff --git a/docs/man/nn_errno.3compat.adoc b/docs/man/nn_errno.3compat.adoc
deleted file mode 100644
index a048543d..00000000
--- a/docs/man/nn_errno.3compat.adoc
+++ /dev/null
@@ -1,79 +0,0 @@
-= nn_errno(3compat)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nn_errno - return most recent error (compatible API)
-
-== SYNOPSIS
-
-[source,c]
-----
-#include <nanomsg/nn.h>
-
-int nn_errno(void);
-----
-
-== DESCRIPTION
-
-The `nn_errno()` function returns the error number corresponding to the
-most recent failed operation by the calling thread.
-
-NOTE: This function is provided for API
-xref:nng_compat.3compat.adoc[compatibility] with legacy _libnanomsg_.
-Consider using the relevant xref:libnng.3.adoc[modern API] instead.
-
-IMPORTANT: The error numbers returned from this function may include
-errors caused by system functions, which overlap the usual `errno` variable,
-and this function simply returns the value of `errno`.
-However, the values returned may include numeric values that are not
-defined by the system, but are unique to _libnanomsg_, such as `EFSM`.
-
-This library implements the following error numbers, in addition to any others
-that might be set for `errno` by the underlying system:
-
-
-== RETURN VALUES
-
-This function returns the value of `errno`.
-If no operation has failed, then this will be zero.
-
-== ERRORS
-
-[horizontal]
-`EINTR`:: Operation interrupted.
-`ENOMEM`:: Insufficient memory.
-`EINVAL`:: Invalid argument.
-`EBUSY`:: Resource is busy.
-`ETIMEDOUT`:: Operation timed out.
-`ECONNREFUSED`:: Connection refused by peer.
-`EBADF`:: Invalid or closed socket.
-`EAGAIN`:: Operation would block.
-`ENOTSUP`:: Protocol or option not supported.
-`EADDRINUSE`:: Requested address is already in use.
-`EFSM`:: Protocol state incorrect.
-`EPROTO`:: Protocol error.
-`EHOSTUNREACH`:: Remote peer is unreachable.
-`EADDRNOTAVAIL`:: Requested address is not available.
-`EACCES`:: Permission denied.
-`EMSGSIZE`:: Message is too large.
-`ECONNABORTED`:: Connection attempt aborted.
-`ECONNRESET`:: Connection reset by peer.
-`EEXIST`:: Resource already exists.
-`EMFILE`:: Too many open files.
-`ENOSPC`:: Insufficient persistent storage.
-
-== SEE ALSO
-
-[.text-left]
-xref:nn_strerror.3compat.adoc[nn_strerror(3compat)],
-xref:nng_compat.3compat.adoc[nng_compat(3compat)],
-xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

