From 0467702bf1e5b4777c254d4116d8f8972b5a44a2 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 14 Apr 2018 14:48:43 -0700
Subject: Fix socket option levels (compat options).

---
 docs/man/nn_getsockopt.3compat.adoc | 6 ++++++
 1 file changed, 6 insertions(+)

(limited to 'docs/man/nn_getsockopt.3compat.adoc')

diff --git a/docs/man/nn_getsockopt.3compat.adoc b/docs/man/nn_getsockopt.3compat.adoc
index 73ab2dee..04c024bc 100644
--- a/docs/man/nn_getsockopt.3compat.adoc
+++ b/docs/man/nn_getsockopt.3compat.adoc
@@ -162,12 +162,18 @@ NOTE: The file descriptor should not be read or written by the application,
 and is not the same as any underlying descriptor used for network sockets.
 Furthermore, the file descriptor should only be polled for _readability_.
 
+The following option is available for `NN_REQ` sockets
+using the `NN_REQ` level:
+
 `NN_REQ_RESEND_IVL`::
 Request retry interval in milliseconds.
 If an `NN_REQ` socket does not receive a reply to a request within this
 period of time, the socket will automatically resend the request.
 The default value is 60000 (one minute).
 
+The following option is available for `NN_SURVEYOR` sockets
+using the `NN_SURVEYOR` level:
+
 `NN_SURVEYOR_DEADLINE`::
 Survey deadline in milliseconds for `NN_SURVEYOR` sockets.
 After sending a survey message, the socket will only accept responses
-- 
cgit v1.2.3-70-g09d2

