From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nn_getsockopt.3compat.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nn_getsockopt.3compat.adoc')

diff --git a/docs/man/nn_getsockopt.3compat.adoc b/docs/man/nn_getsockopt.3compat.adoc
index 75adfb58..7701013a 100644
--- a/docs/man/nn_getsockopt.3compat.adoc
+++ b/docs/man/nn_getsockopt.3compat.adoc
@@ -97,10 +97,10 @@ The default is 100.
 `NN_RECONNECT_IVL_MAX`::
 Maximum reconnect interval in milliseconds.
 Subsequent reconnection attempts after a failed attempt are made at
-exponentially increasing intervals (backoff), but the interval is
+exponentially increasing intervals (back-off), but the interval is
 capped by this value.
 If this value is smaller than `NN_RECONNECT_IVL`, then no exponential
-backoff is performed, and each reconnect interval will be determined
+back-off is performed, and each reconnect interval will be determined
 solely by `NN_RECONNECT_IVL`.
 The default is zero.
 
-- 
cgit v1.2.3-70-g09d2

