From d0ac83e34bde86e1fa888677adf7c99217e3205a Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 20:31:18 -0700
Subject: Harmonize the use of NNG in documentation.

NNG is always a noun, never an adjective, and should always
be capitalized.  We also reduced some unnecessary usages of it.
---
 docs/man/nn_setsockopt.3compat.adoc | 7 +++----
 1 file changed, 3 insertions(+), 4 deletions(-)

(limited to 'docs/man/nn_setsockopt.3compat.adoc')

diff --git a/docs/man/nn_setsockopt.3compat.adoc b/docs/man/nn_setsockopt.3compat.adoc
index 00371ef9..860d522e 100644
--- a/docs/man/nn_setsockopt.3compat.adoc
+++ b/docs/man/nn_setsockopt.3compat.adoc
@@ -50,7 +50,7 @@ thus size 4, unless otherwise indicated.)
 `NN_SNDBUF`::
 Send buffer size in bytes.
 
-NOTE: In _nng_ buffers are sized as a count of messages rather than
+NOTE: In _NNG_ buffers are sized as a count of messages rather than
 bytes, and so an attempt to estimate a conversion based upon a predetermined
 message size of 1kB is made.
 The value supplied is rounded up to the nearest value divisible by 1024, and
@@ -103,7 +103,7 @@ The default is zero.
 This option is ignored, and exists only for compatibility.
 
 NOTE: This option was unreliable in early releases of _libnanomsg_, and
-is unsupported in _nng_ and recent _libnanomsg_ releases.
+is unsupported in _NNG_ and recent _libnanomsg_ releases.
 Applications needing assurance of message delivery should either include an
 explicit notification (automatic with the `NN_REQ` protocol) or allow
 sufficient time for the socket to drain before closing the socket or exiting.
@@ -178,8 +178,7 @@ This `NN_IPC` option is not supported at this time.
 This `NN_TCP` option is not supported at this time.
 
 `NN_WS_MSG_TYPE`::
-This `NN_WS` option is not supported, as _nng_ only supports binary messages
-in this implementation.
+This `NN_WS` option is not supported at this time.
 
 == RETURN VALUES
 
-- 
cgit v1.2.3-70-g09d2

