From 6f8944a96a5acd509014caae4e57dafbba51e126 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 30 Mar 2024 22:14:33 -0700
Subject: finished proto open pages

---
 docs/man/nn_shutdown.3compat.adoc | 55 ---------------------------------------
 1 file changed, 55 deletions(-)
 delete mode 100644 docs/man/nn_shutdown.3compat.adoc

(limited to 'docs/man/nn_shutdown.3compat.adoc')

diff --git a/docs/man/nn_shutdown.3compat.adoc b/docs/man/nn_shutdown.3compat.adoc
deleted file mode 100644
index 06a5cd5a..00000000
--- a/docs/man/nn_shutdown.3compat.adoc
+++ /dev/null
@@ -1,55 +0,0 @@
-= nn_shutdown(3compat)
-//
-// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nn_shutdown - shut down endpoint (compatible API)
-
-== SYNOPSIS
-
-[source, c]
-----
-#include <nanomsg/nn.h>
-
-int nn_shutdown(int sock, int ep)
-----
-
-== DESCRIPTION
-
-The `nn_shutdown()` shuts down the endpoint _ep_, which is either a listener or
-a dialer) on the socket _sock_.
-This will stop the socket from either accepting new connections, or establishing
-old ones.
-Additionally, any established connections associated with _ep_ will be closed.
-
-NOTE: This function is provided for API
-xref:nng_compat.3compat.adoc[compatibility] with legacy _libnanomsg_.
-Consider using the relevant xref:libnng.3.adoc[modern API] instead.
-
-== RETURN VALUES
-
-This function returns zero on success, and -1 on error.
-
-== ERRORS
-
-[horizontal]
-`EBADF`:: The socket _sock_ is not open.
-`EINVAL`:: An invalid _ep_ was supplied.
-
-== SEE ALSO
-
-[.text-left]
-xref:nn_bind.3compat.adoc[nn_bind(3compat)],
-xref:nn_connect.3compat.adoc[nn_connect(3compat)],
-xref:nn_errno.3compat.adoc[nn_errno(3compat)],
-xref:nn_socket.3compat.adoc[nn_socket(3compat)],
-xref:nng_compat.3compat.adoc[nn_compat(3compat)],
-xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

