From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nn_shutdown.3compat.adoc | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'docs/man/nn_shutdown.3compat.adoc')

diff --git a/docs/man/nn_shutdown.3compat.adoc b/docs/man/nn_shutdown.3compat.adoc
index eb9efd24..06a5cd5a 100644
--- a/docs/man/nn_shutdown.3compat.adoc
+++ b/docs/man/nn_shutdown.3compat.adoc
@@ -1,6 +1,6 @@
 = nn_shutdown(3compat)
 //
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
 // Copyright 2018 Capitar IT Group BV <info@capitar.com>
 //
 // This document is supplied under the terms of the MIT License, a
@@ -24,11 +24,11 @@ int nn_shutdown(int sock, int ep)
 
 == DESCRIPTION
 
-The `nn_shutdown()` shuts down the "`endpoint`"  _ep_ on the socket _sock_.
+The `nn_shutdown()` shuts down the endpoint _ep_, which is either a listener or
+a dialer) on the socket _sock_.
 This will stop the socket from either accepting new connections, or establishing
 old ones.
-Additionally, any established connections associated with _ep_ will be
-closed.
+Additionally, any established connections associated with _ep_ will be closed.
 
 NOTE: This function is provided for API
 xref:nng_compat.3compat.adoc[compatibility] with legacy _libnanomsg_.
-- 
cgit v1.2.3-70-g09d2

