From 1b825b063da65fe3d88c1ca97afded0d6f6ccc14 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 5 Apr 2024 08:40:25 -0700
Subject: Compat pages converted.

---
 docs/man/nn_term.3compat.adoc | 59 -------------------------------------------
 1 file changed, 59 deletions(-)
 delete mode 100644 docs/man/nn_term.3compat.adoc

(limited to 'docs/man/nn_term.3compat.adoc')

diff --git a/docs/man/nn_term.3compat.adoc b/docs/man/nn_term.3compat.adoc
deleted file mode 100644
index 79b6a1e3..00000000
--- a/docs/man/nn_term.3compat.adoc
+++ /dev/null
@@ -1,59 +0,0 @@
-= nn_term(3compat)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nn_term - terminate library (compatible API)
-
-== SYNOPSIS
-
-[source,c]
-----
-#include <nanomsg/nn.h>
-
-void nn_term(void);
-----
-
-== DESCRIPTION
-
-The `nn_term()` function closes any open sockets, and frees all resources
-allocated by the library.
-Any operations that are currently in progress will be terminated, and will
-fail with error `EBADF` or `ETERM`.
-
-NOTE: This function is provided for API
-xref:nng_compat.3compat.adoc[compatibility] with legacy _libnanomsg_.
-Consider using the relevant xref:libnng.3.adoc[modern API] instead.
-
-IMPORTANT: This function is not thread-safe, and is not suitable for use
-in library calls.
-The intended purpose of this is to clean up at application termination; for
-example by registering this function with `atexit()`.
-This can help prevent false leak reports caused when memory checkers notice
-global resources allocated by the library.
-Libraries should never use this function, but should explicitly close their
-own sockets directly.
-
-== RETURN VALUES
-
-None.
-
-== ERRORS
-
-None.
-
-== SEE ALSO
-
-[.text-left]
-xref:nn_errno.3compat.adoc[nn_errno(3compat)],
-xref:nn_socket.3compat.adoc[nn_socket(3compat)],
-xref:nng_compat.3compat.adoc[nng_compat(3compat)],
-xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

