From abb4dcaf84b4224788c1d343fe557079e053ee5b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 24 Mar 2024 13:36:51 -0700
Subject: subdir for compmat

---
 docs/man/nng_aio_begin.3.adoc | 64 -------------------------------------------
 1 file changed, 64 deletions(-)
 delete mode 100644 docs/man/nng_aio_begin.3.adoc

(limited to 'docs/man/nng_aio_begin.3.adoc')

diff --git a/docs/man/nng_aio_begin.3.adoc b/docs/man/nng_aio_begin.3.adoc
deleted file mode 100644
index 30a73648..00000000
--- a/docs/man/nng_aio_begin.3.adoc
+++ /dev/null
@@ -1,64 +0,0 @@
-= nng_aio_begin(3)
-//
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_aio_begin - begin asynchronous I/O operation
-
-== SYNOPSIS
-
-[source, c]
-----
-#include <nng/nng.h>
-
-bool nng_aio_begin(nng_aio *aio);
-----
-
-== DESCRIPTION
-
-The `nng_aio_begin()` function is called by the I/O provider to indicate that
-it is going to process the operation.
-
-The function may return `false`, indicating that the _aio_ has been closed
-by the caller asynchronously.
-In this case the provider should abandon the operation and do nothing else.
-
-This operation should be called at the start of any I/O operation, and must
-be called not more than once for a given I/O operation on a given _aio_.
-
-Once this function is called, if `true` is returned, then the provider MUST
-guarantee that xref:nng_aio_finish.3.adoc[`nng_aio_finish()`] is called for the _aio_
-exactly once, when the operation is complete or canceled.
-
-NOTE: This function is only for I/O providers (those actually performing
-the operation such as HTTP handler functions or transport providers); ordinary
-users of the _aio_ should not call this function.
-
-== RETURN VALUES
-
-[horizontal]
-`true`:: The operation has been started.
-`false`:: The operation cannot be started.
-
-== ERRORS
-
-None.
-
-== SEE ALSO
-
-[.text-left]
-xref:nng_aio_alloc.3.adoc[nng_aio_alloc(3)],
-xref:nng_aio_cancel.3.adoc[nng_aio_cancel(3)],
-xref:nng_aio_defer.3.adoc[nng_aio_defer(3)],
-xref:nng_aio_finish.3.adoc[nng_aio_finish(3)],
-xref:nng_aio_result.3.adoc[nng_aio_result(3)],
-xref:nng_aio.5.adoc[nng_aio(5)],
-xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

