From e7e980c228c76e108bbc4812f40645d93626757f Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 30 Aug 2018 15:10:54 -0700
Subject: fixes #688 Dangling link in nng_aio_begin()

---
 docs/man/nng_aio_begin.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_aio_begin.3.adoc')

diff --git a/docs/man/nng_aio_begin.3.adoc b/docs/man/nng_aio_begin.3.adoc
index fd72d401..5ea2a3e3 100644
--- a/docs/man/nng_aio_begin.3.adoc
+++ b/docs/man/nng_aio_begin.3.adoc
@@ -35,7 +35,7 @@ This operation should be called at the start of any I/O operation, and must
 be called not more than once for a given I/O operation on a given _aio_.
 
 Once this function is called, if `true` is returned, then the provider MUST
-guarantee that `<<nng_aio_finish.3#nng_aio_finish()>>` is called for the _aio_
+guarantee that `<<nng_aio_finish.3#,nng_aio_finish()>>` is called for the _aio_
 exactly once, when the operation is complete or canceled.
 
 NOTE: This function is only for I/O providers (those actually performing
-- 
cgit v1.2.3-70-g09d2

