From 7b6e73f23104a50b898da1065cf9d3bf8b6a3bca Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 29 Jun 2019 17:26:04 -0700
Subject: more .adoc markup fixes.

This is mostly mechanical-ish fixups to adjust markup style
for cross references. A bit of care and feeding needed, so
we haven't finished the list, but this gets a significant chunk
of them.
---
 docs/man/nng_aio_finish.3.adoc | 16 ++++++++--------
 1 file changed, 8 insertions(+), 8 deletions(-)

(limited to 'docs/man/nng_aio_finish.3.adoc')

diff --git a/docs/man/nng_aio_finish.3.adoc b/docs/man/nng_aio_finish.3.adoc
index 4733c1f2..f4c6edac 100644
--- a/docs/man/nng_aio_finish.3.adoc
+++ b/docs/man/nng_aio_finish.3.adoc
@@ -27,7 +27,7 @@ void nng_aio_finish(nng_aio *aio, int err);
 The `nng_aio_finish()` function marks operation associated with _aio_ as
 complete, with the status _err_.
 This will be the result returned by
-`<<nng_aio_result.3#,nng_aio_result()>>`.
+xref:nng_aio_result.3.adoc[`nng_aio_result()`].
 
 This function causes the callback associated with the _aio_ to called.
 
@@ -51,10 +51,10 @@ None.
 == SEE ALSO
 
 [.text-left]
-<<nng_aio_alloc.3#,nng_aio_alloc(3)>>,
-<<nng_aio_begin.3#,nng_aio_begin(3)>>,
-<<nng_aio_cancel.3#,nng_aio_cancel(3)>>,
-<<nng_aio_defer.3#,nng_aio_defer(3)>>,
-<<nng_aio_result.3#,nng_aio_result(3)>>,
-<<nng_aio.5#,nng_aio(5)>>,
-<<nng.7#,nng(7)>>
+xref:nng_aio_alloc.3.adoc[nng_aio_alloc(3)],
+xref:nng_aio_begin.3.adoc[nng_aio_begin(3)],
+xref:nng_aio_cancel.3.adoc[nng_aio_cancel(3)],
+xref:nng_aio_defer.3.adoc[nng_aio_defer(3)],
+xref:nng_aio_result.3.adoc[nng_aio_result(3)],
+xref:nng_aio.5.adoc[nng_aio(5)],
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

