From 7b6e73f23104a50b898da1065cf9d3bf8b6a3bca Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 29 Jun 2019 17:26:04 -0700
Subject: more .adoc markup fixes.

This is mostly mechanical-ish fixups to adjust markup style
for cross references. A bit of care and feeding needed, so
we haven't finished the list, but this gets a significant chunk
of them.
---
 docs/man/nng_aio_free.3.adoc | 10 +++++-----
 1 file changed, 5 insertions(+), 5 deletions(-)

(limited to 'docs/man/nng_aio_free.3.adoc')

diff --git a/docs/man/nng_aio_free.3.adoc b/docs/man/nng_aio_free.3.adoc
index da45eff2..31c75414 100644
--- a/docs/man/nng_aio_free.3.adoc
+++ b/docs/man/nng_aio_free.3.adoc
@@ -28,7 +28,7 @@ The `nng_aio_free()` function frees an allocated asynchronous I/O handle.
 If any operation is in progress, the operation is canceled, and the
 caller is blocked until the operation is completely canceled, to ensure
 that it is safe to deallocate the handle and any associated resources.
-(This is done by implicitly calling `<<nng_aio_stop.3#,nng_aio_stop()>>`.)
+(This is done by implicitly calling xref:nng_aio_stop.3.adoc[`nng_aio_stop()`].)
 
 == RETURN VALUES
 
@@ -41,7 +41,7 @@ None.
 == SEE ALSO
 
 [.text-left]
-<<nng_aio_alloc.3#,nng_aio_alloc(3)>>,
-<<nng_aio_stop.3#,nng_aio_stop(3)>>,
-<<nng_aio.5#,nng_aio(5)>>,
-<<nng.7#,nng(7)>>
+xref:nng_aio_alloc.3.adoc[nng_aio_alloc(3)],
+xref:nng_aio_stop.3.adoc[nng_aio_stop(3)],
+xref:nng_aio.5.adoc[nng_aio(5)],
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

