From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/man/nng_aio_get_output.adoc | 54 ++++++++++++++++++++++++++++++++++++++++
 1 file changed, 54 insertions(+)
 create mode 100644 docs/man/nng_aio_get_output.adoc

(limited to 'docs/man/nng_aio_get_output.adoc')

diff --git a/docs/man/nng_aio_get_output.adoc b/docs/man/nng_aio_get_output.adoc
new file mode 100644
index 00000000..a362e0ae
--- /dev/null
+++ b/docs/man/nng_aio_get_output.adoc
@@ -0,0 +1,54 @@
+= nng_aio_get_output(3)
+//
+// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2018 Capitar IT Group BV <info@capitar.com>
+//
+// This document is supplied under the terms of the MIT License, a
+// copy of which should be located in the distribution where this
+// file was obtained (LICENSE.txt).  A copy of the license may also be
+// found online at https://opensource.org/licenses/MIT.
+//
+
+== NAME
+
+nng_aio_get_output - return output result
+
+== SYNOPSIS
+
+[source, c]
+-----------
+#include <nng/nng.h>
+
+void *nng_aio_get_output(nng_aio *aio, unsigned int index);
+-----------
+
+== DESCRIPTION
+
+The `nng_aio_get_output()` function returns the output result at _index_
+resulting from the asynchronous operation associated with _aio_.
+
+The type and semantics of output parameters are determined by specific
+operations.
+
+NOTE: If the _index_ does not correspond to a defined output for the operation,
+or the operation did not succeed, then the return value will be `NULL`.
+
+CAUTION: It is an error to call this function while the _aio_ is currently
+in use by an active asynchronous operation, or if no operation has been
+performed using the _aio_ yet.
+
+== RETURN VALUES
+
+The __index__th result of the operation, or `NULL`.
+
+== ERRORS
+
+None.
+
+== SEE ALSO
+
+<<nng_aio_alloc#,nng_aio_alloc(3)>>,
+<<nng_aio_get_output#,nng_aio_get_output(3)>>,
+<<nng_aio_set_input#,nng_aio_set_input(3)>>,
+<<nng_aio_result#,nng_aio_result(3)>>,
+<<nng#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

