From 0ddaee41ec753805fa12eeabd679870802528dac Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 29 May 2018 17:03:51 -0700
Subject: fixes #495 SEE ALSO should use [align=left] fixes #494 ERRORS section
 should use [horizontal]

These changes address some basic formatting consistency things,
and ultimately (when combined with other tooling changes that are
not part of this repo) lead to vastly improved layout in the
printed documentation.

While here we removed trailing whitespace, and did certain other
minor markup tweaks.
---
 docs/man/nng_aio_result.3.adoc | 4 +++-
 1 file changed, 3 insertions(+), 1 deletion(-)

(limited to 'docs/man/nng_aio_result.3.adoc')

diff --git a/docs/man/nng_aio_result.3.adoc b/docs/man/nng_aio_result.3.adoc
index a793b9ad..f6c6f406 100644
--- a/docs/man/nng_aio_result.3.adoc
+++ b/docs/man/nng_aio_result.3.adoc
@@ -37,11 +37,12 @@ callback, or after waiting for the operation to complete with
 
 == RETURN VALUES
 
-The result of the operation, either zero on success, or an error 
+The result of the operation, either zero on success, or an error
 number on failure.
 
 == ERRORS
 
+[horizontal]
 `NNG_ETIMEDOUT`:: The operation timed out.
 `NNG_ECANCELED`:: The operation was canceled.
 
@@ -49,6 +50,7 @@ Various other return values are possible dependending on the operation.
 
 == SEE ALSO
 
+[.text-left]
 <<nng_aio_abort.3#,nng_aio_abort(3)>>,
 <<nng_aio_alloc.3#,nng_aio_alloc(3)>>,
 <<nng_aio_wait.3#,nng_aio_wait(3)>>,
-- 
cgit v1.2.3-70-g09d2

