From 7ab64fc0c030368e54a9179a674121ca2d44ae6c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 2 Jun 2021 08:05:06 -0700
Subject: fixes #1452 nng_aio_set_iov doc bug regarding max IOV count

---
 docs/man/nng_aio_set_iov.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_aio_set_iov.3.adoc')

diff --git a/docs/man/nng_aio_set_iov.3.adoc b/docs/man/nng_aio_set_iov.3.adoc
index 3c774bd1..26c2789a 100644
--- a/docs/man/nng_aio_set_iov.3.adoc
+++ b/docs/man/nng_aio_set_iov.3.adoc
@@ -40,7 +40,7 @@ structures, which have the following definition:
 The _iov_ is copied into storage in the _aio_ itself, so that callers may use stack allocated `nng_iov` structures.
 The values pointed to by the `iov_buf` members are *not* copied by this function though.
 
-A maximum of eight (8) `nng_iov` members may be supplied.
+A maximum of four (4) `nng_iov` members may be supplied.
 
 NOTE: Earlier versions of the library could accept longer scatter-gather lists.
 However, no known consumers have ever needed a scatter-gather list longer than 4 vectors.
-- 
cgit v1.2.3-70-g09d2

