From abb4dcaf84b4224788c1d343fe557079e053ee5b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 24 Mar 2024 13:36:51 -0700
Subject: subdir for compmat

---
 docs/man/nng_aio_set_timeout.3.adoc | 74 -------------------------------------
 1 file changed, 74 deletions(-)
 delete mode 100644 docs/man/nng_aio_set_timeout.3.adoc

(limited to 'docs/man/nng_aio_set_timeout.3.adoc')

diff --git a/docs/man/nng_aio_set_timeout.3.adoc b/docs/man/nng_aio_set_timeout.3.adoc
deleted file mode 100644
index a82b0c83..00000000
--- a/docs/man/nng_aio_set_timeout.3.adoc
+++ /dev/null
@@ -1,74 +0,0 @@
-= nng_aio_set_timeout(3)
-//
-// Copyright 2023 Staysail Systems, Inc. <info@staysail.tech>
-// Copyright 2018 Capitar IT Group BV <info@capitar.com>
-//
-// This document is supplied under the terms of the MIT License, a
-// copy of which should be located in the distribution where this
-// file was obtained (LICENSE.txt).  A copy of the license may also be
-// found online at https://opensource.org/licenses/MIT.
-//
-
-== NAME
-
-nng_aio_set_timeout - set asynchronous I/O timeout
-
-== SYNOPSIS
-
-[source, c]
-----
-#include <nng/nng.h>
-
-typedef int nng_duration;
-void nng_aio_set_timeout(nng_aio *aio, nng_duration timeout);
-
-typedef uint64_t nng_time;
-void nng_aio_set_expire(nng_aio *aio, nng_time expiration);
-----
-
-== DESCRIPTION
-
-The `nng_aio_set_timeout()` function sets a _timeout_(((timeout)))
-for the asynchronous operation associated with _aio_.
-This causes a timer to be started when the operation is actually started.
-If the timer expires before the operation is completed, then it is
-aborted with an error of `NNG_ETIMEDOUT`.
-The _timeout_ is specified as a relative number of milliseconds.
-
-If the timeout is `NNG_DURATION_INFINITE`, then no timeout is used.
-If the timeout is `NNG_DURATION_DEFAULT`, then a "default" or socket-specific
-timeout is used.
-(This is frequently the same as `NNG_DURATION_INFINITE`.)
-
-The `nng_aio_set_expire()` function is similar to `nng_aio_set_timeout()`, but sets
-an absolute expiration time based on the system clock. The _expiration_
-is expressed as a number of milliseconds since some point in the past.
-The xref:nng_clock.3supp.adoc[`nng_clock()`] function can be used to determine
-the current value of the clock.
-
-TIP: As most operations involve some context switching, it is usually a good
-idea to allow at least a few tens of milliseconds before timing them out --
-a too small timeout might not allow the operation to properly begin before
-giving up!
-
-The value of _timeout_ set for the _aio_ is persistent, so that if the
-handle is reused for multiple operations, they will have the same relative
-timeout.
-
-== RETURN VALUES
-
-None.
-
-== ERRORS
-
-None.
-
-== SEE ALSO
-
-[.text-left]
-xref:nng_aio_alloc.3.adoc[nng_aio_alloc(3)],
-xref:nng_aio_cancel.3.adoc[nng_aio_cancel(3)],
-xref:nng_aio_result.3.adoc[nng_aio_result(3)],
-xref:nng_aio.5.adoc[nng_aio(5)],
-xref:nng_duration.5.adoc[nng_duration(5)],
-xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

