From 8c529c4143ce06b4c72fca1aa593e32e62fdbe18 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Fri, 3 Jan 2025 08:59:47 -0800
Subject: stable: add nng_socket_close to aid transition to 2.0

---
 docs/man/nng_close.3.adoc | 9 +++++++--
 1 file changed, 7 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_close.3.adoc')

diff --git a/docs/man/nng_close.3.adoc b/docs/man/nng_close.3.adoc
index 1867df07..827bf929 100644
--- a/docs/man/nng_close.3.adoc
+++ b/docs/man/nng_close.3.adoc
@@ -1,6 +1,6 @@
 = nng_close(3)
 //
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2025 Systems, Inc. <info@staysail.tech>
 // Copyright 2018 Capitar IT Group BV <info@capitar.com>
 //
 // This document is supplied under the terms of the MIT License, a
@@ -20,14 +20,19 @@ nng_close - close socket
 #include <nng/nng.h>
 
 int nng_close(nng_socket s);
+int nng_socket_close(nng_socket s);
 ----
 
 == DESCRIPTION
 
-The `nng_close()` function closes the supplied socket, _s_.
+The `nng_socket_close()` function closes the supplied socket, _s_.
 Messages that have been submitted for sending may be flushed or delivered,
 depending upon the transport.
 
+The `nng_close()` function also does this, and is the old name for this
+function.  The `nng_close()` function is considered deprecated and may
+be removed in the next major release.
+
 Further attempts to use the socket after this call returns will result
 in `NNG_ECLOSED`.
 Threads waiting for operations on the socket when this
-- 
cgit v1.2.3-70-g09d2

