From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_compat.3compat.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_compat.3compat.adoc')

diff --git a/docs/man/nng_compat.3compat.adoc b/docs/man/nng_compat.3compat.adoc
index 05fe1383..0276663c 100644
--- a/docs/man/nng_compat.3compat.adoc
+++ b/docs/man/nng_compat.3compat.adoc
@@ -38,7 +38,7 @@ nng_compat - compatibility with nanomsg 1.0
 The <<nng.7#,_nng_>> library provides source-level compatibility for
 most _nanomsg_ 1.0 applications.
 
-IMPORTANT: This is intended to faciliate converting ((legacy applications)) to
+IMPORTANT: This is intended to facilitate converting ((legacy applications)) to
 use the _nng_ library.
 New applications should use the newer <<nng.7#,_nng_>> API instead.
 
-- 
cgit v1.2.3-70-g09d2

