From 45f3f141850a0ac07c31906748752571652683df Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Mon, 16 Apr 2018 11:40:28 -0700
Subject: fixes #344 nn_poll() legacy API missing

This includes the test from legacy libnanomsg and a man page.

We have refactored the message queue notification system so
that it uses nni_pollable, leading we hope to a more consistent
system, and reducing the code size and complexity.

We also fixed the size of the NN_RCVFD and NN_SNDFD so that they
are a SOCKET on Windows systems, rather than an integer.  This
addresses 64-bit compilation problems.
---
 docs/man/nng_compat.3compat.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_compat.3compat.adoc')

diff --git a/docs/man/nng_compat.3compat.adoc b/docs/man/nng_compat.3compat.adoc
index 5493e41f..9029fb05 100644
--- a/docs/man/nng_compat.3compat.adoc
+++ b/docs/man/nng_compat.3compat.adoc
@@ -63,7 +63,7 @@ ifndef::backend-pdf[]
 `<<nn_recv.3compat#,nn_recv()>>`:: receive data
 `<<nn_shutdown.3compat#,nn_shutdown()>>`:: shut down endpoint
 `<<nn_close.3compat#,nn_close()>>`:: close socket
-//`nn_poll()`:: poll sockets
+`<<nn_poll.3compat#,nn_poll()>>`:: poll sockets
 `<<nn_device.3compat#,nn_device()>>`:: create forwarding device
 `<<nn_recvmsg.3compat#,nn_recvmsg()>>`:: receive message
 `<<nn_sendmsg.3compat#,nn_sendmsg()>>`:: send message
@@ -89,7 +89,7 @@ ifdef::backend-pdf[]
 |`<<nn_recv.3compat#,nn_recv()>>`|receive data
 |`<<nn_shutdown.3compat#,nn_shutdown()>>`|shut down endpoint
 |`<<nn_close.3compat#,nn_close()>>`|close socket
-//|`nn_poll()`|poll sockets
+|`<<nn_poll.3compat#,nn_poll()>>`|poll sockets
 |`<<nn_device.3compat#,nn_device()>>`|create forwarding device
 |`<<nn_recvmsg.3compat#,nn_recvmsg()>>`|receive message
 |`<<nn_sendmsg.3compat#,nn_sendmsg()>>`|send message
-- 
cgit v1.2.3-70-g09d2

