From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_compat.3compat.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_compat.3compat.adoc')

diff --git a/docs/man/nng_compat.3compat.adoc b/docs/man/nng_compat.3compat.adoc
index c70e1752..d259ced5 100644
--- a/docs/man/nng_compat.3compat.adoc
+++ b/docs/man/nng_compat.3compat.adoc
@@ -63,7 +63,7 @@ See the <<Caveats>> section below.
 === Compiling
 
 When compiling legacy _nanomsg_ applications, it will generally be
-necessary to change the include search path to add the "`compat`" subdirectory
+necessary to change the include search path to add the `compat` subdirectory
 of the directory where headers were installed.
 For example, if _nng_ is installed in `$prefix`, then header files will
 normally be located in `$prefix/include/nng`.
-- 
cgit v1.2.3-70-g09d2

