From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_cv_alloc.3supp.adoc | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

(limited to 'docs/man/nng_cv_alloc.3supp.adoc')

diff --git a/docs/man/nng_cv_alloc.3supp.adoc b/docs/man/nng_cv_alloc.3supp.adoc
index 0668298f..ac059a92 100644
--- a/docs/man/nng_cv_alloc.3supp.adoc
+++ b/docs/man/nng_cv_alloc.3supp.adoc
@@ -32,11 +32,11 @@ the mutex _mtx_, and returns it in _cvp_.
 
 Every condition variable is associated with a mutex, which must be
 owned when a thread waits for the condition using
-<<nng_cv_wait.3supp#,`nng_cv_wait()`>> or
-<<nng_cv_until.3supp#,`nng_cv_until()`>>.
+`<<nng_cv_wait.3supp#,nng_cv_wait()>>` or
+`<<nng_cv_until.3supp#,nng_cv_until()>>`.
 The mutex must also be owned when signaling the condition using the
-<<nng_cv_wake.3supp#,`nng_cv_wake()`>> or
-<<nng_cv_wake1.3supp#,`nng_cv_wake1()`>> functions.
+`<<nng_cv_wake.3supp#,nng_cv_wake()>>` or
+`<<nng_cv_wake1.3supp#,nng_cv_wake1()>>` functions.
 
 == RETURN VALUES
 
-- 
cgit v1.2.3-70-g09d2

