From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_cv_until.3supp.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_cv_until.3supp.adoc')

diff --git a/docs/man/nng_cv_until.3supp.adoc b/docs/man/nng_cv_until.3supp.adoc
index 4d39ecc0..9cf49e4d 100644
--- a/docs/man/nng_cv_until.3supp.adoc
+++ b/docs/man/nng_cv_until.3supp.adoc
@@ -26,9 +26,9 @@ int nng_cv_wait(nng_cv *cv, nng_time when);
 == DESCRIPTION
 
 The `nng_cv_until()` waits until either the condition variable _cv_ is signaled
-by another thread calling either <<nng_cv_wake.3supp#,`nng_cv_wake()`>> or
-<<nng_cv_wake1.3supp#,`nng_cv_wake1()`>>, or the system clock (as tracked
-by <<nng_clock.3supp#,`nng_clock()`>>) reaches _when_.
+by another thread calling either `<<nng_cv_wake.3supp#,nng_cv_wake()>>` or
+`<<nng_cv_wake1.3supp#,nng_cv_wake1()>>`, or the system clock (as tracked
+by `<<nng_clock.3supp#,nng_clock()>>`) reaches _when_.
 
 The caller must have have ownership of the mutex that was used when
 _cv_ was allocated.
-- 
cgit v1.2.3-70-g09d2

