From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_cv_wait.3supp.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_cv_wait.3supp.adoc')

diff --git a/docs/man/nng_cv_wait.3supp.adoc b/docs/man/nng_cv_wait.3supp.adoc
index 69a21208..1d9c16be 100644
--- a/docs/man/nng_cv_wait.3supp.adoc
+++ b/docs/man/nng_cv_wait.3supp.adoc
@@ -36,7 +36,7 @@ atomically just before returning to the caller.
 (The waiting is done without holding the mutex.)
 
 NOTE: Any condition may be used or checked, but the condition must be
-checked, as it is possible for this function to wake up "`spuriously`".
+checked, as it is possible for this function to wake up spuriously.
 The best way to do this is inside a loop that repeats until the condition
 tests for true.
 
-- 
cgit v1.2.3-70-g09d2

