From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_cv_wake.3supp.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_cv_wake.3supp.adoc')

diff --git a/docs/man/nng_cv_wake.3supp.adoc b/docs/man/nng_cv_wake.3supp.adoc
index a42191c6..6ee2945d 100644
--- a/docs/man/nng_cv_wake.3supp.adoc
+++ b/docs/man/nng_cv_wake.3supp.adoc
@@ -1,6 +1,6 @@
 = nng_cv_wake(3supp)
 //
-// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2020 Staysail Systems, Inc. <info@staysail.tech>
 // Copyright 2018 Capitar IT Group BV <info@capitar.com>
 //
 // This document is supplied under the terms of the MIT License, a
@@ -36,8 +36,8 @@ NOTE: The caller should already have set the condition that the waiters
 will check, while holding the mutex.
 
 TIP: This function wakes all threads, which is generally safer but can
-lead to a problem known as the "`thundering herd`" when there are many
-waiters, as they are all woken simultaneously.
+lead to a performance problem when there are many waiters, as they are all
+woken simultaneously and may contend for resources.
 See xref:nng_cv_wake1.3supp.adoc[`nng_cv_wake1()`] for a solution to this problem.
 
 == RETURN VALUES
-- 
cgit v1.2.3-70-g09d2

