From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_dial.3.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_dial.3.adoc')

diff --git a/docs/man/nng_dial.3.adoc b/docs/man/nng_dial.3.adoc
index 525f092a..d2eb7605 100644
--- a/docs/man/nng_dial.3.adoc
+++ b/docs/man/nng_dial.3.adoc
@@ -25,7 +25,7 @@ int nng_dial(nng_socket s, const char *url, nng_dialer *dp, int flags);
 == DESCRIPTION
 
 The `nng_dialer()` function creates a newly initialized
-<<nng_dialer.5#,`nng_dialer`>> object,
+`<<nng_dialer.5#,nng_dialer>>` object,
 associated with socket _s_, and configured to listen at the
 address specified by _url_, and starts it.
 If the value of _dp_ is not `NULL`, then
@@ -62,8 +62,8 @@ it also generally makes diagnosing failures somewhat more difficult.
 
 Because the dialer is started immediately, it is generally not possible
 to apply extra configuration; if that is needed applications should consider
-using <<nng_dialer_create.3#,`nng_dialer_create()`>> and 
-<<nng_dialer_start.3#,`nng_dialer_start()`>> instead.
+using `<<nng_dialer_create.3#,nng_dialer_create()>>` and 
+`<<nng_dialer_start.3#,nng_dialer_start()>>` instead.
 
 == RETURN VALUES
 
-- 
cgit v1.2.3-70-g09d2

