From cf576e329c8b17604e0bfa1005d502086e4cf8b6 Mon Sep 17 00:00:00 2001
From: Nathan Kent <nkent2@cs.rochester.edu>
Date: Tue, 18 Sep 2018 19:55:48 -0400
Subject: Update docs for `nng_dial` and `nng_listen`

Closes #731
---
 docs/man/nng_dial.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_dial.3.adoc')

diff --git a/docs/man/nng_dial.3.adoc b/docs/man/nng_dial.3.adoc
index 50fa229c..77eda33b 100644
--- a/docs/man/nng_dial.3.adoc
+++ b/docs/man/nng_dial.3.adoc
@@ -76,7 +76,7 @@ This function returns 0 on success, and non-zero otherwise.
 `NNG_ECLOSED`:: The socket _s_ is not open.
 `NNG_ECONNREFUSED`:: The remote peer refused the connection.
 `NNG_ECONNRESET`:: The remote peer reset the connection.
-`NNG_EINVAL`:: An invalid set of _flags_ was specified.
+`NNG_EINVAL`:: An invalid set of _flags_ or an invalid _url_ was specified.
 `NNG_ENOMEM`:: Insufficient memory is available.
 `NNG_EPEERAUTH`:: Authentication or authorization failure.
 `NNG_EPROTO`:: A protocol error occurred.
-- 
cgit v1.2.3-70-g09d2

