From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_dialer_close.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_dialer_close.3.adoc')

diff --git a/docs/man/nng_dialer_close.3.adoc b/docs/man/nng_dialer_close.3.adoc
index 7c516bdf..5ec1a5fe 100644
--- a/docs/man/nng_dialer_close.3.adoc
+++ b/docs/man/nng_dialer_close.3.adoc
@@ -25,7 +25,7 @@ int nng_dialer_close(nng_dialer d);
 == DESCRIPTION
 
 The `nng_dialer_close()` function closes the listener _d_.
-This also closes any `<<nng_pipe.5#,nng_pipe>>` ojects that have
+This also closes any `<<nng_pipe.5#,nng_pipe>>` objects that have
 been created by the dialer.
 
 Once this function returns, the dialer _d_ and any of its resources
-- 
cgit v1.2.3-70-g09d2

