From b26fc00bd1a8e83aabf7a6c1735d911b9d253d84 Mon Sep 17 00:00:00 2001
From: jake-ruyi <38336907+jake-ruyi@users.noreply.github.com>
Date: Wed, 20 Feb 2019 20:38:04 -0700
Subject: Fixes manpage typos (#886)

---
 docs/man/nng_dialer_close.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_dialer_close.3.adoc')

diff --git a/docs/man/nng_dialer_close.3.adoc b/docs/man/nng_dialer_close.3.adoc
index 5ec1a5fe..e1cf741f 100644
--- a/docs/man/nng_dialer_close.3.adoc
+++ b/docs/man/nng_dialer_close.3.adoc
@@ -24,7 +24,7 @@ int nng_dialer_close(nng_dialer d);
 
 == DESCRIPTION
 
-The `nng_dialer_close()` function closes the listener _d_.
+The `nng_dialer_close()` function closes the dialer _d_.
 This also closes any `<<nng_pipe.5#,nng_pipe>>` objects that have
 been created by the dialer.
 
-- 
cgit v1.2.3-70-g09d2

