From 89eb7d5c612bf80e223367e88f20d55d7fbea252 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 7 Nov 2024 23:19:23 -0800
Subject: Document a number of things as deprecated.

This does not fully mark them in the headers, to avoid complicating
test suites and such, for now.
---
 docs/man/nng_dialer_get.3.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_dialer_get.3.adoc')

diff --git a/docs/man/nng_dialer_get.3.adoc b/docs/man/nng_dialer_get.3.adoc
index e23ecd2c..5084c1b3 100644
--- a/docs/man/nng_dialer_get.3.adoc
+++ b/docs/man/nng_dialer_get.3.adoc
@@ -75,7 +75,7 @@ It is acceptable to pass `NULL` for _val_ if the value in _valszp_ is zero.
 This can be used to determine the size of the buffer needed to receive
 the object.
 
-TIP: It may be easier to use one of the typed forms of this function.
+NOTE: This function is deprecated.  Use one of the typed functions listed below instead.
 
 `nng_dialer_get_bool()`::
 This function is for options which take a Boolean (`bool`).
-- 
cgit v1.2.3-70-g09d2

