From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_getopt.3.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_getopt.3.adoc')

diff --git a/docs/man/nng_getopt.3.adoc b/docs/man/nng_getopt.3.adoc
index 4d6ae868..1117d72b 100644
--- a/docs/man/nng_getopt.3.adoc
+++ b/docs/man/nng_getopt.3.adoc
@@ -65,10 +65,10 @@ _valszp_.
 
 When the function returns, the actual size of the data copied (or that
 would have been copied if sufficient space were present) is stored at
-the location referened by _valszp_.
+the location referenced by _valszp_.
 If the caller's buffer is not large enough to hold the entire object,
 then the copy is truncated.
-Therefore the caller should check for truncation by verifyng that the
+Therefore the caller should check for truncation by verifying that the
 returned size in _valszp_ does not exceed the original buffer size.
 
 It is acceptable to pass `NULL` for _val_ if the value in _valszp_ is zero.
@@ -76,7 +76,7 @@ This can be used to determine the size of the buffer needed to receive
 the object.
 
 ==== `nng_getopt_bool()`
-This function is for options which take a boolean (`bool`).
+This function is for options which take a Boolean (`bool`).
 The value will be stored at _ivalp_.
 
 ==== `nng_getopt_int()`
-- 
cgit v1.2.3-70-g09d2

