From 5cf750697624d4fd63cfe26921209d7c30e1a2d2 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Mon, 21 Jan 2019 22:40:10 -0800
Subject: fixes #872 create unified nng_stream API

This is a major change, and includes changes to use a polymorphic
stream API for all transports.  There have been related bugs fixed
along the way.  Additionally the man pages have changed.

The old non-polymorphic APIs are removed now.  This is a breaking
change, but the old APIs were never part of any released public API.
---
 docs/man/nng_getopt.3.adoc | 12 ++++++------
 1 file changed, 6 insertions(+), 6 deletions(-)

(limited to 'docs/man/nng_getopt.3.adoc')

diff --git a/docs/man/nng_getopt.3.adoc b/docs/man/nng_getopt.3.adoc
index 06d6ac19..491d6038 100644
--- a/docs/man/nng_getopt.3.adoc
+++ b/docs/man/nng_getopt.3.adoc
@@ -59,25 +59,25 @@ on the actual option, and will be documented with the option itself.
 This function is untyped and can be used to retrieve the value of any option.
 The caller must store a pointer to a buffer to receive the value in _val_,
 and the size of the buffer shall be stored at the location referenced by
-_valszp_. +
- +
+_valszp_.
++
 When the function returns, the actual size of the data copied (or that
 would have been copied if sufficient space were present) is stored at
 the location referenced by _valszp_.
 If the caller's buffer is not large enough to hold the entire object,
 then the copy is truncated.
 Therefore the caller should check for truncation by verifying that the
-returned size in _valszp_ does not exceed the original buffer size. +
- +
+returned size in _valszp_ does not exceed the original buffer size.
++
 It is acceptable to pass `NULL` for _val_ if the value in _valszp_ is zero.
 This can be used to determine the size of the buffer needed to receive
 the object.
-
++
 TIP: It may be easier to use one of the typed forms of this function.
 
 `nng_getopt_bool()`::
 This function is for options which take a Boolean (`bool`).
-The value will be stored at _ivalp_.
+The value will be stored at _bvalp_.
 
 `nng_getopt_int()`::
 This function is for options which take an integer (`int`).
-- 
cgit v1.2.3-70-g09d2

