From e892f2e13786af2ffec74934ac363e3a9890f7b7 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 7 Mar 2018 23:53:10 -0800
Subject: Fix a number of broken links.

There are still some busted links that have to be fixed,
but these are the ones that are just typos or trivially
fixed.  There is of course some content still missing.
---
 docs/man/nng_http_conn_read_all.adoc | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

(limited to 'docs/man/nng_http_conn_read_all.adoc')

diff --git a/docs/man/nng_http_conn_read_all.adoc b/docs/man/nng_http_conn_read_all.adoc
index e5f89389..f98eedd5 100644
--- a/docs/man/nng_http_conn_read_all.adoc
+++ b/docs/man/nng_http_conn_read_all.adoc
@@ -34,7 +34,7 @@ called first, to set the scatter/gather vector for _aio_.
 
 This function returns immediately, with no return value.  Completion of
 the operation is signaled via the _aio_, and the final result may be
-obtained via <<nng_aio_result#,nng_aio_result>>. That result will
+obtained via <<nng_aio_result#,nng_aio_result(3)>>. That result will
 either be zero or an error code.
 
 The I/O operation completes only when the entire amount of data
@@ -69,7 +69,6 @@ None.
 <<nng_aio_count#,nng_aio_count(3)>>,
 <<nng_aio_result#,nng_aio_result(3)>>,
 <<nng_aio_set_iov#,nng_aio_set_iov(3)>>,
-<<nng_http_alloc_handler#,nng_http_alloc_handler(3)>>,
 <<nng_http_client_connect#,nng_http_client_connect(3)>>,
 <<nng_http_conn_read#,nng_http_conn_read(3)>>,
 <<nng_strerror#,nng_strerror(3)>>,
-- 
cgit v1.2.3-70-g09d2

