From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_http_handler_alloc.3http.adoc | 18 +++++++++---------
 1 file changed, 9 insertions(+), 9 deletions(-)

(limited to 'docs/man/nng_http_handler_alloc.3http.adoc')

diff --git a/docs/man/nng_http_handler_alloc.3http.adoc b/docs/man/nng_http_handler_alloc.3http.adoc
index 12c6043a..be6f2568 100644
--- a/docs/man/nng_http_handler_alloc.3http.adoc
+++ b/docs/man/nng_http_handler_alloc.3http.adoc
@@ -49,38 +49,38 @@ considered when determining whether the handler should be called.
 
 Additionally each handler has a method it is registered to handle
 (the default is "GET", see
-<<nng_http_handler_set_method.3http#,`nng_http_handler_set_method()`>>), and
+`<<nng_http_handler_set_method.3http#,nng_http_handler_set_method()>>`), and
 optionally a 'Host' header it can be matched against (see
-<<nng_http_handler_set_host.3http#,`nng_http_handler_set_host()`>>).
+`<<nng_http_handler_set_host.3http#,nng_http_handler_set_host()>>`).
 
 In some cases, a handler may reference a logical tree rather (directory)
 rather than just a single element.
-(See <<nng_http_handler_set_tree.3http#,`nng_http_handler_set_tree()`>>).
+(See `<<nng_http_handler_set_tree.3http#,nng_http_handler_set_tree()>>`).
 
 === Custom Handler
 
 The generic (first) form of this creates a handler that uses a user-supplied
 function to process HTTP requests.
 This function uses the asynchronous I/O framework.
-The function takes a pointer to an <<nng_aio.5#,`nng_aio`>> structure.
+The function takes a pointer to an `<<nng_aio.5#,nng_aio>>` structure.
 That structure will be passed with the following input values (retrieved with
-<<nng_aio_get_input.3#,`nng_aio_get_input()`>>):
+`<<nng_aio_get_input.3#,nng_aio_get_input()>>`):
 
    0: `nng_http_req *` __request__:: The client's HTTP request.
    1: `nng_http_handler *` __handler__:: Pointer to the handler object.
    2: `nng_http_conn *` __conn__:: The underlying HTTP connection.
 
 The handler should create an `nng_http_res *` response (such as via
-<<nng_http_res_alloc.3http#,`nng_http_res_alloc()`>> or
-<<nng_http_res_alloc_error.3http#,`nng_http_res_alloc_error()`>>) and store that
+`<<nng_http_res_alloc.3http#,nng_http_res_alloc()>>` or
+`<<nng_http_res_alloc_error.3http#,nng_http_res_alloc_error()>>`) and store that
 in as the first output (index 0) with
-<<nng_aio_set_output.3#,`nng_aio_set_output()`>>.
+`<<nng_aio_set_output.3#,nng_aio_set_output()>>`.
 
 Alternatively, the handler may send the HTTP response (and any associated
 body data) itself using the connection.
 In that case the output at index 0 of the _aio_ should be NULL.
 
-Finally, using the <<nng_aio_finish.3#,`nng_aio_finish()`>> function, the
+Finally, using the `<<nng_aio_finish.3#,nng_aio_finish()>>` function, the
 _aio_ should be completed successfully.
 If any non-zero status is returned back to the caller instead,
 then a generic 500 response will be created and
-- 
cgit v1.2.3-70-g09d2

