From 3e0ecffbd60ac2a6f50643adc07b0d2fea0cb22b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 30 May 2018 18:10:59 -0700
Subject: Fix numerous spelling errrors.

These were found with the help of "aspell".

Additionally, while reviewing the output from the spell checker,
several content errors were noticed and fixed.
---
 docs/man/nng_http_handler_alloc.3http.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_http_handler_alloc.3http.adoc')

diff --git a/docs/man/nng_http_handler_alloc.3http.adoc b/docs/man/nng_http_handler_alloc.3http.adoc
index 630871cc..187b91b6 100644
--- a/docs/man/nng_http_handler_alloc.3http.adoc
+++ b/docs/man/nng_http_handler_alloc.3http.adoc
@@ -93,14 +93,14 @@ a handler configured to serve a directory tree.
 The _uri_ is taken as the root, and files are served from the directory
 tree rooted at _path_.
 
-When the client Request-URI resolves to a directory in the filesystem,
+When the client Request-URI resolves to a directory in the file system,
 the handler looks first for a file named `index.html` or `index.htm`.
 If one is found, then that file is returned back to the client.
 If no such index file exists, then an `NNG_HTTP_STATUS_NOT_FOUND` (404) error is
 sent back to the client.
 
 The `Content-Type` will be set automatically based upon the extension
-of the requsted file name.
+of the requested file name.
 If a content type cannot be determined from
 the extension, then `application/octet-stream` is used.
 
@@ -111,7 +111,7 @@ a handler to serve up a single file; it does not traverse directories
 or search for `index.html` or `index.htm` files.
 
 The `Content-Type` will be set automatically based upon the extension
-of the requsted file name.
+of the requested file name.
 If a content type cannot be determined from
 the extension, then `application/octet-stream` is used.
 
-- 
cgit v1.2.3-70-g09d2

