From 3d3fa690c4f81bf4ed0a2de42c3c8fbb9f4cca5c Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Tue, 1 May 2018 17:11:32 -0700
Subject: Markup fixes, ensuring links are colored properly.

It turns out that when creating cross references, we need to
make any text styling (generally literal characters) outside of
the link, to avoid having the styling override the link color.
(We prefer to have links colored for ease of use.)

While here a few other markup, and actual content, errors were fixed.
---
 docs/man/nng_http_handler_set_data.3http.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_http_handler_set_data.3http.adoc')

diff --git a/docs/man/nng_http_handler_set_data.3http.adoc b/docs/man/nng_http_handler_set_data.3http.adoc
index 318919a9..a6be46fb 100644
--- a/docs/man/nng_http_handler_set_data.3http.adoc
+++ b/docs/man/nng_http_handler_set_data.3http.adoc
@@ -29,7 +29,7 @@ void *nng_http_handler_get_data(nng_http_handler *handler, void *data,
 The `nng_http_handler_set_data()` function is used to set an additional
 _data_ for the _handler_.
 The stored _data_ can be retrieved later in the handler function using
-<<nng_http_handler_get_data.3http#,`nng_http_handler_get_data()`>>.
+`<<nng_http_handler_get_data.3http#,nng_http_handler_get_data()>>`.
 
 Additionally, when the handler is deallocated, if _dtor_ is not `NULL`,
 then it will be called with _data_ as its argument.
-- 
cgit v1.2.3-70-g09d2

