From dcb962389c5f71bc25cdb84f3363eed95bad9bdd Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sat, 6 Jul 2019 13:33:55 -0700
Subject: fixes #861 Man pages need to use .adoc suffix

---
 docs/man/nng_http_req_set_version.3http.adoc | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

(limited to 'docs/man/nng_http_req_set_version.3http.adoc')

diff --git a/docs/man/nng_http_req_set_version.3http.adoc b/docs/man/nng_http_req_set_version.3http.adoc
index 24f9ace5..04fd1b0d 100644
--- a/docs/man/nng_http_req_set_version.3http.adoc
+++ b/docs/man/nng_http_req_set_version.3http.adoc
@@ -53,6 +53,6 @@ This function returns 0 on success, and non-zero otherwise.
 == SEE ALSO
 
 [.text-left]
-<<nng_http_req_alloc.3http#,nng_http_req_alloc(3http)>>,
-<<nng_http_req_get_version.3http#,nng_http_req_get_version(3http)>>,
-<<nng.7#,nng(7)>>
+xref:nng_http_req_alloc.3http.adoc[nng_http_req_alloc(3http)],
+xref:nng_http_req_get_version.3http.adoc[nng_http_req_get_version(3http)],
+xref:nng.7.adoc[nng(7)]
-- 
cgit v1.2.3-70-g09d2

