From 0863d12e2b5173efeb074cbc9fa05f26274f126b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 12 Sep 2018 12:48:13 -0700
Subject: fixes #717 need nng_http_req_reset and nng_http_res_reset fixes #718
 http_transact is still not right fixes #719 calculation of buffer size is
 incorrect in http

---
 docs/man/nng_http_res_alloc.3http.adoc | 5 +++--
 1 file changed, 3 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_http_res_alloc.3http.adoc')

diff --git a/docs/man/nng_http_res_alloc.3http.adoc b/docs/man/nng_http_res_alloc.3http.adoc
index 2b7699a7..b395b502 100644
--- a/docs/man/nng_http_res_alloc.3http.adoc
+++ b/docs/man/nng_http_res_alloc.3http.adoc
@@ -28,8 +28,8 @@ int nng_http_res_alloc(nng_http_res **resp);
 The `nng_http_res_alloc()` function allocates a new HTTP response structure
 and stores a pointer to it in __resp__.
 The response will be initialized
-with status code 200 (`NNG_HTTP_STATUS_OK`), and a reason phrase of "OK",
-and HTTP protocol version "HTTP/1.1".
+with status code 200 (`NNG_HTTP_STATUS_OK`), and a reason phrase of `"OK`",
+and HTTP protocol version `"HTTP/1.1`".
 
 TIP: When an error response is needed, consider using
 `<<nng_http_res_alloc_error.3http#,nng_http_res_alloc_error()>>` instead.
@@ -59,6 +59,7 @@ This function returns 0 on success, and non-zero otherwise.
 <<nng_http_res_get_reason.3http#,nng_http_res_get_reason(3http)>>,
 <<nng_http_res_get_status.3http#,nng_http_res_get_status(3http)>>,
 <<nng_http_res_get_version.3http#,nng_http_res_get_version(3http)>>,
+<<nng_http_res_reset.3http#,nng_http_res_reset(3http)>>,
 <<nng_http_res_set_data.3http#,nng_http_res_set_data(3http)>>,
 <<nng_http_res_set_reason.3http#,nng_http_res_set_reason(3http)>>,
 <<nng_http_res_set_status.3http#,nng_http_res_set_status(3http)>>,
-- 
cgit v1.2.3-70-g09d2

