From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_http_res_alloc.3http.adoc | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

(limited to 'docs/man/nng_http_res_alloc.3http.adoc')

diff --git a/docs/man/nng_http_res_alloc.3http.adoc b/docs/man/nng_http_res_alloc.3http.adoc
index ba2c9b5f..f546d151 100644
--- a/docs/man/nng_http_res_alloc.3http.adoc
+++ b/docs/man/nng_http_res_alloc.3http.adoc
@@ -28,8 +28,8 @@ int nng_http_res_alloc(nng_http_res **resp);
 The `nng_http_res_alloc()` function allocates a new HTTP response structure
 and stores a pointer to it in __resp__.
 The response will be initialized
-with status code 200 (`NNG_HTTP_STATUS_OK`), and a reason phrase of `"OK`",
-and HTTP protocol version `"HTTP/1.1`".
+with status code 200 (`NNG_HTTP_STATUS_OK`), and a reason phrase of `OK`,
+and HTTP protocol version `HTTP/1.1`.
 
 TIP: When an error response is needed, consider using
 xref:nng_http_res_alloc_error.3http.adoc[`nng_http_res_alloc_error()`] instead.
-- 
cgit v1.2.3-70-g09d2

