From e892f2e13786af2ffec74934ac363e3a9890f7b7 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 7 Mar 2018 23:53:10 -0800
Subject: Fix a number of broken links.

There are still some busted links that have to be fixed,
but these are the ones that are just typos or trivially
fixed.  There is of course some content still missing.
---
 docs/man/nng_http_res_alloc.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_http_res_alloc.adoc')

diff --git a/docs/man/nng_http_res_alloc.adoc b/docs/man/nng_http_res_alloc.adoc
index 9de3d012..1f4520aa 100644
--- a/docs/man/nng_http_res_alloc.adoc
+++ b/docs/man/nng_http_res_alloc.adoc
@@ -47,7 +47,7 @@ This function returns 0 on success, and non-zero otherwise.
 <<nng_http_conn_read_res#,nng_http_conn_read_res(3)>>,
 <<nng_http_conn_write_res#,nng_http_conn_write_res(3)>>,
 <<nng_http_req_alloc#,nng_http_req_alloc(3)>>,
-<<nng_http_res_alloc_errror#,nng_http_res_alloc_error(3)>>,
+<<nng_http_res_alloc_error#,nng_http_res_alloc_error(3)>>,
 <<nng_http_res_add_header#,nng_http_res_add_header(3)>>,
 <<nng_http_res_copy_data#,nng_http_res_copy_data(3)>>,
 <<nng_http_res_del_header#,nng_http_res_del_header(3)>>,
-- 
cgit v1.2.3-70-g09d2

