From 0863d12e2b5173efeb074cbc9fa05f26274f126b Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Wed, 12 Sep 2018 12:48:13 -0700
Subject: fixes #717 need nng_http_req_reset and nng_http_res_reset fixes #718
 http_transact is still not right fixes #719 calculation of buffer size is
 incorrect in http

---
 docs/man/nng_http_res_free.3http.adoc | 6 +++++-
 1 file changed, 5 insertions(+), 1 deletion(-)

(limited to 'docs/man/nng_http_res_free.3http.adoc')

diff --git a/docs/man/nng_http_res_free.3http.adoc b/docs/man/nng_http_res_free.3http.adoc
index 0c7f2445..e97f0be6 100644
--- a/docs/man/nng_http_res_free.3http.adoc
+++ b/docs/man/nng_http_res_free.3http.adoc
@@ -28,6 +28,9 @@ void nng_http_res_free(nng_http_res *req);
 The `nng_http_res_free()` function deallocates the HTTP response structure
 _res_ entirely.
 
+TIP: Instead of freeing and reallocating response structures, it is possible
+to reuse _res_ with `<<nng_http_res_reset.3http#,nng_http_res_reset()>>`.
+
 == RETURN VALUES
 
 None.
@@ -39,5 +42,6 @@ None.
 == SEE ALSO
 
 [.text-left]
-<<nng_http_res_alloc.3http#,nng_http_req_alloc(3http)>>,
+<<nng_http_res_alloc.3http#,nng_http_res_alloc(3http)>>,
+<<nng_http_res_reset.3http#,nng_http_res_reset(3http)>>,
 <<nng.7#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

