From dbc61a5038cacc516a49d00a59a669e2617cff51 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Thu, 18 Jun 2020 19:19:06 -0700
Subject: Language cleanups in the documentation.

Mostly this is removal of the smart quotes, which were
over-used, and misused, and could have been mistaken to
be pejorative.  A few other minor nits were fixed while here.
---
 docs/man/nng_http_res_set_status.3http.adoc | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'docs/man/nng_http_res_set_status.3http.adoc')

diff --git a/docs/man/nng_http_res_set_status.3http.adoc b/docs/man/nng_http_res_set_status.3http.adoc
index 2083c3b7..e57764d4 100644
--- a/docs/man/nng_http_res_set_status.3http.adoc
+++ b/docs/man/nng_http_res_set_status.3http.adoc
@@ -102,7 +102,7 @@ enum {
 Please see the relevant HTTP RFCs for the semantics and correct
 use of these status codes.
 
-TIP: It is a good idea to also set the "`reason phrase`" with
+TIP: It is a good idea to also set the reason message with
 xref:nng_http_res_set_reason.3http.adoc[`nng_http_set_reason()`].
 This will help any humans who may have to diagnose a failure.
 
-- 
cgit v1.2.3-70-g09d2

