From 87795b46f2bc732bd11067805709161bdc00d6b6 Mon Sep 17 00:00:00 2001
From: Garrett D'Amore <garrett@damore.org>
Date: Sun, 25 Feb 2018 17:56:55 -0800
Subject: More man page reorganization.

Man pages need special handling, and we can have other kinds of documentation
like initial starting guides, etc., which would have different processing
applied.  So lets move them off into their own directory.
---
 docs/man/nng_http_res_set_status.adoc | 122 ++++++++++++++++++++++++++++++++++
 1 file changed, 122 insertions(+)
 create mode 100644 docs/man/nng_http_res_set_status.adoc

(limited to 'docs/man/nng_http_res_set_status.adoc')

diff --git a/docs/man/nng_http_res_set_status.adoc b/docs/man/nng_http_res_set_status.adoc
new file mode 100644
index 00000000..f5e45cc4
--- /dev/null
+++ b/docs/man/nng_http_res_set_status.adoc
@@ -0,0 +1,122 @@
+= nng_http_res_set_status(3)
+//
+// Copyright 2018 Staysail Systems, Inc. <info@staysail.tech>
+// Copyright 2018 Capitar IT Group BV <info@capitar.com>
+//
+// This document is supplied under the terms of the MIT License, a
+// copy of which should be located in the distribution where this
+// file was obtained (LICENSE.txt).  A copy of the license may also be
+// found online at https://opensource.org/licenses/MIT.
+//
+
+== NAME
+
+nng_http_res_set_status - set HTTP response status
+
+== SYNOPSIS
+
+[source, c]
+-----------
+#include <nng/nng.h>
+#include <nng/supplemental/http/http.h>
+
+int nng_http_res_set_status(nng_http_res *res, uint16_t status);
+-----------
+
+== DESCRIPTION
+
+The `nng_http_res_set_status()` sets the numeric HTTP status code
+associated with the response _res_ to _status_.   The default value
+for a newly allocated response is 200 (`NNG_HTTP_STATUS_OK`).
+
+The _status_ is not verified, so the caller should take care to ensure
+that only a valid code is supplied.
+
+For convenience, a number of predefined symbols are available.
+
+[source, c]
+----
+enum {
+    NNG_HTTP_STATUS_CONTINUE                 = 100,
+    NNG_HTTP_STATUS_SWITCHING                = 101,
+    NNG_HTTP_STATUS_PROCESSING               = 102,
+    NNG_HTTP_STATUS_OK                       = 200,
+    NNG_HTTP_STATUS_CREATED                  = 201,
+    NNG_HTTP_STATUS_ACCEPTED                 = 202,
+    NNG_HTTP_STATUS_NOT_AUTHORITATIVE        = 203,
+    NNG_HTTP_STATUS_NO_CONTENT               = 204,
+    NNG_HTTP_STATUS_RESET_CONTENT            = 205,
+    NNG_HTTP_STATUS_PARTIAL_CONTENT          = 206,
+    NNG_HTTP_STATUS_MULTI_STATUS             = 207,
+    NNG_HTTP_STATUS_ALREADY_REPORTED         = 208,
+    NNG_HTTP_STATUS_IM_USED                  = 226,
+    NNG_HTTP_STATUS_MULTIPLE_CHOICES         = 300,
+    NNG_HTTP_STATUS_STATUS_MOVED_PERMANENTLY = 301,
+    NNG_HTTP_STATUS_FOUND                    = 302,
+    NNG_HTTP_STATUS_SEE_OTHER                = 303,
+    NNG_HTTP_STATUS_NOT_MODIFIED             = 304,
+    NNG_HTTP_STATUS_USE_PROXY                = 305,
+    NNG_HTTP_STATUS_TEMPORARY_REDIRECT       = 307,
+    NNG_HTTP_STATUS_PERMANENT_REDIRECT       = 308,
+    NNG_HTTP_STATUS_BAD_REQUEST              = 400,
+    NNG_HTTP_STATUS_UNAUTHORIZED             = 401,
+    NNG_HTTP_STATUS_PAYMENT_REQUIRED         = 402,
+    NNG_HTTP_STATUS_FORBIDDEN                = 403,
+    NNG_HTTP_STATUS_NOT_FOUND                = 404,
+    NNG_HTTP_STATUS_METHOD_NOT_ALLOWED       = 405,
+    NNG_HTTP_STATUS_NOT_ACCEPTABLE           = 406,
+    NNG_HTTP_STATUS_PROXY_AUTH_REQUIRED      = 407,
+    NNG_HTTP_STATUS_REQUEST_TIMEOUT          = 408,
+    NNG_HTTP_STATUS_CONFLICT                 = 409,
+    NNG_HTTP_STATUS_GONE                     = 410,
+    NNG_HTTP_STATUS_LENGTH_REQUIRED          = 411,
+    NNG_HTTP_STATUS_PRECONDITION_FAILED      = 412,
+    NNG_HTTP_STATUS_PAYLOAD_TOO_LARGE        = 413,
+    NNG_HTTP_STATUS_ENTITY_TOO_LONG          = 414,
+    NNG_HTTP_STATUS_UNSUPPORTED_MEDIA_TYPE   = 415,
+    NNG_HTTP_STATUS_RANGE_NOT_SATISFIABLE    = 416,
+    NNG_HTTP_STATUS_EXPECTATION_FAILED       = 417,
+    NNG_HTTP_STATUS_TEAPOT                   = 418,
+    NNG_HTTP_STATUS_UNPROCESSABLE_ENTITY     = 422,
+    NNG_HTTP_STATUS_LOCKED                   = 423,
+    NNG_HTTP_STATUS_FAILED_DEPENDENCY        = 424,
+    NNG_HTTP_STATUS_UPGRADE_REQUIRED         = 426,
+    NNG_HTTP_STATUS_PRECONDITION_REQUIRED    = 428,
+    NNG_HTTP_STATUS_TOO_MANY_REQUESTS        = 429,
+    NNG_HTTP_STATUS_HEADERS_TOO_LARGE        = 431,
+    NNG_HTTP_STATUS_UNAVAIL_LEGAL_REASONS    = 451,
+    NNG_HTTP_STATUS_INTERNAL_SERVER_ERROR    = 500,
+    NNG_HTTP_STATUS_NOT_IMPLEMENTED          = 501,
+    NNG_HTTP_STATUS_BAD_GATEWAY              = 502,
+    NNG_HTTP_STATUS_SERVICE_UNAVAILABLE      = 503,
+    NNG_HTTP_STATUS_GATEWAY_TIMEOUT          = 504,
+    NNG_HTTP_STATUS_HTTP_VERSION_NOT_SUPP    = 505,
+    NNG_HTTP_STATUS_VARIANT_ALSO_NEGOTIATES  = 506,
+    NNG_HTTP_STATUS_INSUFFICIENT_STORAGE     = 507,
+    NNG_HTTP_STATUS_LOOP_DETECTED            = 508,
+    NNG_HTTP_STATUS_NOT_EXTENDED             = 510,
+    NNG_HTTP_STATUS_NETWORK_AUTH_REQUIRED    = 511, 
+}       
+----
+
+Please see the relevant HTTP RFCs for the semantics and correct
+use of these status codes.
+
+TIP: It is a good idea to also set the "reason phrase" with
+<<nng_http_res_set_reason#,nng_http_set_reason(3)>>.  This 
+will help any humans who may have to diagnose any failure.
+
+== RETURN VALUES
+
+This function returns 0 on success, and non-zero otherwise.
+
+== ERRORS
+
+`NNG_ENOTSUP`:: No support for HTTP in the library.
+
+== SEE ALSO
+
+<<nng_http_res_alloc#,nng_http_res_alloc(3)>>,
+<<nng_http_res_get_status#,nng_http_req_get_status(3)>>,
+<<nng_http_res_set_reason#,nng_http_req_set_reason(3)>>,
+<<nng#,nng(7)>>
-- 
cgit v1.2.3-70-g09d2

